FBHFåΩ\Θ'
ASTRA help system ▄ 9 ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  No help available in this context.
'	
ASTRA ▄ ¢ ▀▀▀▀▀▀
  This program performs computer configuration analysis and provides
  detailed information on your computer  hardware  and  its  working
  modes.
'
Running in Windows ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Program runs in a DOS-window under Windows 9x/Me. Due to  the  use
  of the external Win32 module,  program running in a DOS-window  is
  absolutely identical to the program operation in pure DOS.  Before
  starting  the  program  in  multitask  OS,    please  close    all
  applications and make sure that no programs are using disk  drives
  and sound card otherwise identification of these  devices  can  be
  incorrect.  Attention: after starting the program all data in  the
  Windows clipboard will be lost.  The program can't  be  run  in  a
  DOS-window under Windows 3.x, Windows NT/2000/XP and OS/2.  Please
  use ASTRA32 for Windows NT4/2000/XP/Server 2003/95/98/ME.   Please
  visit http://www.astra32.com  to  learn  more  about  ASTRA32  for
  Windows.
'
Information ▄ " ▀▀▀▀▀▀▀▀▀▀▀▀
  Program main menu
b
    System Summary
    DMI System Info
    DMI Motherboard Info
    CPU Info
    BIOS Info
    PCI/AGP Info
    SPD Memory Info
    DMI Memory Info
    IDE (ATA/ATAPI) Info
    SCSI Devices Info
    Drives Info
    USB Devices Info
    PnP Info
    Printers Info
    DMI/SMBIOS Info
    DMI Slots Info
    DMI Ports Info
    Monitor Info
    Video Info

    Exit to DOS

7J^
wä	Æú╖╦Σ·
",
#>$R%e&x'ë
(Ö'F
System Summary ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
Processor Summary k
  Processor: Vendor and name of  the  processor  and  also  expected
  (not-overclocked) processor clock.
╧
  Coprocessor: Vendor and name of the numeric coprocessor.  In 486DX
  and higher coprocessor and processor are using  the  same  crystal
  (except NexGen Nx586/686); coprocessor is identified as Internal.
α
  CPU Clock: Processor frequency. For Pentium  processors  frequency
  is  defined  with  the  RDTSC  command  reading  TSC  (Time  Stamp
  Counter).  Frequency accuracy reaches 0.1 MHz with any CPU  usage.
  For 486 and lower processors frequency is defined  by  its  speed.
  For Intel Pentium Pro and higher,  AMD K6-2 and higher,  VIA Cyrix
  III and higher,  IDT WinChip2 and higher processors there  can  be
  identified clock multiplier, FSB clock and bus type (DDR, QDR)
ε
  Level  1  Cache:  L1  cache  size  (cache  for  keeping  data  and
  instruction).  Is identified for Intel  processors  of  the  sixth
  generation and higher, AMD K5 PR120 and higher,  VIA Cyrix III and
  higher, Centaur processors.
╔
  Level 2 Cache: L2  cache  size. L2  cache  is  integrated  in  the
  processor  and  identified  for  Intel  processors  of  the  sixth
  generation, AMD K6-2+ and higher, VIA Cyrix III and higher.
:
  Level 3 Cache: L3 cache size of Intel Xeon processors.

Motherboard Summary Q
  System Name: Can be identified  on  motherboards  with  DMI/SMBIOS
  support.
u
  Motherboard  OEM:  Motherboard  vendor. In  some  cases  the  name
  written on the box doesn't  coincide  with  this  line.    Classic
  example is Acorp.  The company doesn't possess its own  production
  facilities and places orders at Hope Vision, SuperPower, San Li or
  Agama Technology Co. Ltd plants. Can be identified on motherboards
  with AWARD and AMI BIOS.
Q
  Board Model: Can be identified  on  motherboards  with  DMI/SMBIOS
  support.
*
  BIOS Version: BIOS vendor and version.
╫
  Chipset Vendor: Mainboard chipset vendor. Chipset is  a  group  of
  microchip designed to work and sold as a unit in performing one or
  more related functions. Is identified only in systems with the PCI
  bus.
_
  Chipset: Name of chipset.  Is identified only in systems with  the
  PCI bus or AWARD BIOS.
3
  Southbridge Vendor: Chipset southbridge vendor.
%
  Southbridge: Name of southbridge.
4
  PCI Bus Version: If not installed - Not Present.
5
  PnP BIOS Version: If not installed - Not Present.
Q
  DMI/SMBIOS Version: DMI/SMBIOS version.  If not  installed  -  Not
  Present.

Memory Summary Ü
  Base Memory: Base memory size.  Base memory is the first 640 Kb of
  memory running in real mode.  There can be  identified  free  base
  memory size.
m
  Extended Memory: Extended memory size.  Extended memory is all  of
  the memory above the first megabyte.
/
  System Memory: Total size of system memory.
\
  Memory Module: Information on each memory module  (size,    speed,
  type, manufacturer)

Storage Summary X
  Floppy Drive: Capacity and physical size of the floppy disk  (5.25
  or 3.5 inches).
0
  HDD Model: IDE or SCSI HDD vendor and model.
#
  HDD Size: IDE or SCSI HDD size.
k
  CD/DVD Model: ATAPI or  SCSI  devices  vendor  and  model  (CD/DVD
  devices, ZIP, magnetooptics, etc).
Ç
  CD/DVD Speed: Maximum read speed of ATAPI device.   Maximum  write
  speed supported by the device is indicated in brackets.

Video Summary (
  Monitor Vendor: Monitor vendor name.
¥
  Monitor Model: Monitor model  name. Some  monitors  don't  support
  this function.  In this case the  program  will  type  'Old  Style
  Monitor/Cable'.
5
  Video Chip Vendor: Name of the video chip vendor.
-
  Video Chip: Name of the video chip model.
V
  VESA OEM String: Video BIOS ID identified by any video  card  with
  VESA-support.
⌐
  Video Memory: Video memory size returned by  VESA  BIOS  function.
  Some graphics accelerators return not total video memory size  but
  size identified in 2D mode.

Sound Summary @
  Sound Chip Vendor: Is identified only for PnP and PCI cards.
O
  Sound Chip: Sound chip model.  Is identified only for PnP and  PCI
  cards.
$
  Codec Name: Name of AC'97 codec.
<
  Codec Enhancement: 3D Stereo Enhancement of AC'97 codec.
W
  Sound Card Type:  Compatibility  of  the  sound  card  with  Sound
  Blaster cards.
T
  DSP Version: Version of the DSP digital processor installed on the
  sound card.
+
  Base Port: Sound card base port number.
'
  IRQ: Sound card IRQ channel number.
1
  8bit DMA: Sound card 8bit DMA channel number.
3
  16bit DMA: Sound card 16bit DMA channel number.

Printer Summary D
  Printer Vendor: Is identified only for LPT/PnP and USB printers.
C
  Printer Model: Is identified only for LPT/PnP and USB printers.

Operating System Summary ═
  DOS Version: Version and vendor of DOS. Identifies OS location  in
  the memory (in HMA - if DOS is located in high memory area).    MS
  DOS 7.0 and higher is available together with MS Windows 9x/ME.
/
  Windows Version: Windows version and build.
4
  Windows Folder: Folder where Windows is located.

Modem Summary E
  Modem Vendor: Is determined only for ISA/PnP, PCI and USB modems.
D
  Modem Model: Is determined only for ISA/PnP, PCI and USB modems.

Network Summary O
  Network Vendor: Is determined only for  ISA/PnP  and  PCI  network
  cards.
W
  Network Card: Network card model.  Is determined only for  ISA/PnP
  and PCI cards.
E
  MAC Address: Network card MAC address. NetBIOS installed require.

  Network Name: Computer network name.  This  feature  is  available
  only if your computer network name has been specified.

Ports Summary 
  Mouse Type: Possible values: Bus, Serial, InPort, PS/2, HP. If you
  don't have PS/2 mouse,  there will  be  identified  COM-port  with
  installed mouse.  If a mouse driver  is  not  installed  or  mouse
  itself is absent, the program will display a message 'Not Found'.
w
  LPT Ports: Number of parallel ports on the computer.  In  brackets
  the program indicates number of used I/O port.
s
  COM Ports: Number of serial ports on the computer. In brackets the
  program indicates number of used I/O port.
<
  Joystick: Checks if joystick is installed on the system.
'
DMI System Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
System Info 
  System Vendor:
&
  Product Name: System product name.

  Version: System version.
(
  Serial Number: System serial number.
%
  UUID: Universal Unique ID number.
L
  Wake-up Type: Identifies the event that caused the system to power
  up.

  Structure Length:

System Enclosure 0
  Manufacturer: System enclosure manufacturer.
 
  Type: System enclosure type.
&
  Version: System enclosure version.
2
  Serial Number: System enclosure serial number.

  Asset Tag:
U
  Boot-up State: Identifies the state of the enclosure when  it  was
  last booted.
o
  Power Supply State: Identifies the state of the enclosure's  power
  supply (or supplies) when last booted.
P
  Thermal State: Identifies the enclosure's thermal state when  last
  booted.
a
  Security Status:  Identifies  the  enclosure's  physical  security
  status when last booted.
C
  OEM-defined: Contains OEM- or BIOS vendor-specific information.
(
  Height: The height of the enclosure.
b
  Power Cords: Identifies the number of power cords associated  with
  the enclosure or chassis.
B
  Contained Element: Identifies the number of Contained Element.

  Structure Length:
'
DMI Motherboard Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
Motherboard Info %
  Board Vendor: Motherboard vendor.
$
  Product Name: Motherboard model.
!
  Version: Motherboard version.
-
  Serial Number: Motherboard serial number.

  Structure Length:

Onboard Device N Info .
  Information about on board device number N
$
  Description: Device description.

  Device Type:
-
  Status: Device status - enabled/disabled.

System Configuration Options ^
  Contains  information  required  to  configure  the  base  board's
  Jumpers and Switches.
'
CPU Info ▄  ▀▀▀▀▀▀▀▀▀
  CPU Info submenu.
A
    CPU Info
    DMI CPU Info
    Cache Info
    DMI Cache Info
1>O
^''
CPU Info ▄  ▀▀▀▀▀▀▀▀▀
	CPU Info k
  Processor: Vendor and name of  the  processor  and  also  expected
  (not-overclocked) processor clock.
╧
  Coprocessor: Vendor and name of the numeric coprocessor.  In 486DX
  and higher coprocessor and processor are using  the  same  crystal
  (except NexGen Nx586/686); coprocessor is identified as Internal.

  CPU Clock: Processor frequency. For Pentium  processors  frequency
  is  defined  with  the  RDTSC  command  reading  TSC  (Time  Stamp
  Counter).  Frequency accuracy reaches 0.1 MHz with any CPU  usage.
  For 486 and lower processors frequency is defined by its speed.
X
  Frequency Range: Frequency range on which processors of the  given
  type were made.
ε
  Level  1  Cache:  L1  cache  size  (cache  for  keeping  data  and
  instruction).  Is identified for Intel  processors  of  the  sixth
  generation and higher, AMD K5 PR120 and higher,  VIA Cyrix III and
  higher, Centaur processors.
╔
  Level 2 Cache: L2  cache  size. L2  cache  is  integrated  in  the
  processor  and  identified  for  Intel  processors  of  the  sixth
  generation, AMD K6-2+ and higher, VIA Cyrix III and higher.
:
  Level 3 Cache: L3 cache size of Intel Xeon processors.
1
  System Bus Clock: Processor system bus clock.
╠
  FSB Clock: Processor FSB clock and bus  type  (DDR,    QDR).    Is
  determined for Intel Pentium Pro processors and higher,  AMD  K6-2
  and higher, VIA Cyrix III and higher, IDT WinChip2 and higher.
╢
  Multiplier: Processor clock multiplier. Is  determined  for  Intel
  Pentium Pro processors and higher, AMD K6-2 and higher,  VIA Cyrix
  III and higher, IDT WinChip2 and higher.
╢
  Expected Clock: Expected (not-overclocked) processor  clock.    It
  allows to identify the processor overclocked.   Is  available  for
  Intel Pentium Pro processors and higher.

  Platform ID: Socket (slot, socket) and package processor type.  Is
  determined for Intel Pentium II processors and higher.
┘
  Vendor: Identification of the processor's vendor
    'GenuineIntel' - for Intel company;
    'AuthenticAMD' - for AMD company;
    'UMC UMC UMC ' - for UMC company;
    'CyrixInstead' - for Cyrix company;
    'NexGenDriven' - for NexGen company;
    'CentaurHauls' - for Centaur/IDT company;
    'RiseRiseRise' - for Rise company;
    'GenuineTMx86' - for Transmeta company;
    'Geode by NSC' - for National Semiconductor company;
    'SiS SiS SiS ' - for SiS company.
,
  Processor Name: Internal processor name.
╣
  Processor Type: Identifies single,  dual processors and  overdrive
  processors.  The  program  will  type  'Original  OEM  Processor',
  'OverDrive Processor' and 'Dual Processor'.
Θ
  CPUID: Family,  Model,  Stepping. Information  identified  by  the
  CPUID instruction.  Family  is  processor  generation  (for  Intel
  processors: 4 - 486,  5 - Pentium,  6 - Pentium Pro and processors
  based on the it core).
1
  Ext. Family/Model: Extended Family and Model.
6
  CPU Signature: Processor 8-byte verification code.
#
  BrandID: Identifies Celeron,  Pentium  III,    Pentium  III  Xeon,
  Pentium III-S, Pentium III-M, Celeron Mobile,  Pentium 4,  Pentium
  4-M,  Xeon,  Xeon MP,   AMD  Opteron  and  Athlon  64  processors.
  Available on Intel processors based on the 0.18-micron  Coppermine
  technology.
F
  Processor Cores on Die: Number of processor cores on physical die.
T
  Logical CPU Count: Count of logical processors of  Hyper-Threading
  technology.
U
  Max CPUID Level: Values returned by  the  CPUID  instruction  with
  arguments 0.
]
  Max ExtCPUID Level: Values returned by the CPUID instruction  with
  arguments 80000000h.
º
  Serial Number: Processor Serial Number. Available on Intel Pentium
  III and Intel Pentium II Mobile processors. The serial number must
  be enabled in BIOS Setup.
}
  Code Name:  Processor  code  name  before  its  official  release.
  Production technology can be named in brackets, too.
Y
  Core Stepping: Core stepping  to  identify  processor  errors  and
  frequency rates.
@
  MSR XXh: Contents appropriate MSR (Model Specific Register).

Instruction Set #
  List of additional command set.
t
  - Floating-Point Unit On-Chip
  - IA MMX Technology
  - Streaming SIMD Extensions (SSE)
  - Streaming SIMD Ext. - 2 (SSE-2)
  - Streaming SIMD Ext. - 3 (SSE-3)
  - Intel Extended Memory 64 Tech.
  - Intel Architecture - 64 (IA-64)
  - AMD MMX Instruction Extensions
  - AMD 3DNow! Instructions
  - AMD 3DNow! Extensions
  - AMD x86-64 Long Mode
  - Cyrix Extended MMX
  - CMPXCHG8 Instruction Supported
  - CMPXCHG16 Instruction Supported
  - Fast System Call
  - Conditional Move Instruction
  - CLFLUSH Instruction
  - Fast Save and Restore
  - Monitor/MWAIT
  - AMD SYSCALL and SYSRET Instr.
  - AMD Fast Save and Restore

Processor Features A
  List of processor features returned by the CPUID instruction.
Σ
  - Virtual Mode Extension
  - Debugging Extension
  - Page Size Extension
  - Time Stamp Counter
  - Model Specific Registers
  - Physical Address Extension
  - Machine Check Exception
  - On-chip APIC Hardware Supported - built-in local APIC  (must  be
    enabled in BIOS)
  - Memory Type Range Registers
  - Page Global Enable
  - Machine Check Architecture
  - Page Attribute Table
  - 36-bit Page Size Extension
  - Processor Serial Number
  - Debug Store
  - Self-Snoop
  - Hyper-Threading Technology
  - Pending Break Enable
  - CPL-Qualified Debug Stor
  - Context ID
  - Send Task Priority Messages
  - Intel Execute Disable Bit
  - AMD No-execute Page Protection
  - AMD Model-Specific Registers
  - AMD Multiprocessing Capable

Power Management 
  - ACPI Support
  - Thermal Monitor Supported
  - Thermal Monitor 2
  - Enhanced SpeedStep Technology
  - AMD Temperature Sensor
  - AMD Frequency ID Control
  - AMD Voltage ID Control
  - AMD Thermal Trip
  - AMD Thermal Monitoring
  - AMD Software Thermal Control
│
  If your processor doesn't support CPUID,    this  window  will  be
  closed after showing  the  first  three  items  and  displaying  a
  message 'CPUID Command: Not Present'.
'
DMI CPU Info ▄ E ▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information on the CPU's installed on the computer.

Processor N Info )
  Information about processor number N.

  Processor Vendor:
'
  Processor Version: Processor model.
%
  Current Speed: Current CPU speed.
-
  External Clock: External clock frequency.

  Voltage: CPU core voltage.
<
  Processor Upgrade: Socket (slot, socket) processor type.
4
  Processor Status: CPU status - enabled/disabled.
.
  Socket Designation: Reference designation.

  Processor Type:

  Processor Family:
5
  Processor ID1: Raw processor identification data.
4
  Processor ID2: Raw processor identification data
P
  Max Speed: Maximum internal processor speed,  as supported by  the
  system.
(
  Socket Status: CPU socket populated.
%
  Serial Number: CPU serial number.

  Asset Tag:
!
  Part Number: CPU part number.

  Structure Length:
'%
Cache Info ▄ ▒ ▀▀▀▀▀▀▀▀▀▀▀
  The window is available only for Intel  processors  of  the  sixth
  generation and higher,  AMD PR120 and higher,  VIA Cyrix  III  and
  higher and some others.

Level 1 Instruction Cache )
  Size: Level 1 instruction cache size.
"
  Associativity: Number of ways.
1
  Lines per Tag: Number of cache lines per tag.
%
  Lines Size: Size of a cache line.
X
  TLB 4K  Pages. Number  of  Entryes:  TLB  number  of  entryes  for
  4-Kbytes pages.
G
  TLB 4K Pages. Associativity: TLB number of ways for 4-Kbytes pages.
e
  TLB 2/4M Pages. Number of  Entryes:  TLB  number  of  entryes  for
  2-Mbytes and 4-Mbytes pages.
X
  TLB 2/4M Pages. Associativity: TLB number of ways for 2-Mbytes and
  4-Mbytes pages.

Level 1 Data Cache "
  Size: Level 1 data cache size.
"
  Associativity: Number of ways.
1
  Lines per Tag: Number of cache lines per tag.
%
  Lines Size: Size of a cache line.
X
  TLB 4K  Pages. Number  of  Entryes:  TLB  number  of  entryes  for
  4-Kbytes pages.
G
  TLB 4K Pages. Associativity: TLB number of ways for 4-Kbytes pages.
e
  TLB 2/4M Pages. Number of  Entryes:  TLB  number  of  entryes  for
  2-Mbytes and 4-Mbytes pages.
X
  TLB 2/4M Pages. Associativity: TLB number of ways for 2-Mbytes and
  4-Mbytes pages.

Level 2 Cache 
  Size: Level 2 cache size.
"
  Associativity: Number of ways.
1
  Lines per Tag: Number of cache lines per tag.
%
  Lines Size: Size of a cache line.
d
  Instr. TLB 4K Pages.  Number of Entryes: Instruction TLB number of
  entryes for 4-Kbytes pages.
\
  Instr. TLB 4K Pages. Associativity: Instruction TLB number of ways
  for 4-Kbytes pages.
\
  Data. TLB 4K Pages.  Number of Entryes: Data TLB number of entryes
  for 4-Kbytes pages.
X
  Data TLB 4K Pages. Associativity: Data  TLB  number  of  ways  for
  4-Kbytes pages.
t
  Instr. TLB 2/4M Pages.  Number of Entryes: Instruction TLB  number
  of entryes for 2-Mbytes and 4-Mbytes pages.
n
  Instr. TLB 2/4M Pages.  Associativity: Instruction TLB  number  of
  ways for 2-Mbytes and 4-Mbytes pages.
q
  Data. TLB 2/4M Pages.  Number  of  Entryes:  Data  TLB  number  of
  entryes for 2-Mbytes and 4-Mbytes pages.
e
  Data TLB 2/4M Pages. Associativity: Data TLB number  of  ways  for
  2-Mbytes and 4-Mbytes pages.

Level 3 Cache 
  Size: Level 3 cache size.
"
  Associativity: Number of ways.
%
  Lines Size: Size of a cache line.
'
DMI Cache Info ▄ < ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information about L1/L2/L3 cache levels.

Level N Cache $
  Information about cache level N.
)
  Installed Size: Installed cache size.

  Operational Mode:

  Current SRAM Type:
,
  Status: Cache status - enabled/disabled.
.
  Socket Designation: Reference designation.

  Cache Socketed:
G
  Location: Location, relative to the CPU module - internal/external.
A
  Maximum Cache Size: Maximum cache size that can be installed.

  Supported SRAM:
4
  Cache Speed: Cache module speed, in nanoseconds.
S
  Error Correction: Error-correction scheme supported by this  cache
  component.
Q
  System Cache Type: Logical type of cache - instruction  /  data  /
  unified.
.
  Associativity: Associativity of the cache.

  Structure Length:
'&

BIOS Info ▄  ▀▀▀▀▀▀▀▀▀▀
BIOS Info 8
  Motherboard  OEM:  Motherboard  vendor. In  some  cases  the  name
  written on the box doesn't  coincide  with  this  line.    Classic
  example is Acorp.  The company doesn't possess its own  production
  facilities and places orders at Hope Vision, SuperPower, San Li or
  Agama Technology Co. Ltd plants.
[
  OEM URL: Web-address of the motherboard vendor where BIOS  upgrade
  can be downloaded.
*
  BIOS Version: BIOS vendor and version.
ù
  BIOS Model: Model,  Submodel,  Revision: Needed only in  old  BIOS
  versions.  It is installed  as  FCh/01h/00h  in  all  modern  BIOS
  versions.
1
  BIOS Date: Date of issue of the current BIOS.
U
  AWARD Copyright: Information on the vendor's copyright  (only  for
  AWARD BIOS).
n
  Motherboard ID:  Motherboard  ID  displayed  during  the  computer
  start-up (only for AWARD ¿ AMI BIOS).
[
  BIOS ID: BIOS ID displayed during the computer start-up (only  for
  AWARD ¿ AMI BIOS).
/
  BIOS Type: BIOS type (only for AWARD BIOS).
G
  Bus Type: System bus type of the motherboard (only for AWARD BIOS).
B
  BIOS Size: Microchip size containing BIOS (only for AMI BIOS).
>
  Processor: Processor family (only for AWARD and AMI BIOS).
C
  Chipset: Name of the motherboard chipset (only for AWARD BIOS).
9
  Chipset ID: Chipset ID (only for AWARD and AMI BIOS).
O
  BIOS Revision: Number of the BIOS version (only for AWARD and  AMI
  BIOS).
Q
  APM Version: In Energy Star BIOS's there will  be  identified  APM
  version.

DMI BIOS Info 
  BIOS Vendor:

  BIOS Version:
!
  BIOS Date: BIOS release date.
C
  BIOS ROM Size: Size of the physical device containing the BIOS.
@
  Starting Segment: Segment location of BIOS starting address.
3
  Current Language: Currently installed language.
6
  Number of Language: Number of languages available.

  Structure Length:

Bus Supported *
  System buses, which supported by BIOS.
░
  - PCI is Supported
  - AGP is Supported
  - USB is Supported
  - ISA is Supported
  - VLBus is Supported
  - MCA is Supported
  - EISA is Supported
  - PC Card is Supported

Boot Options *
  Boot options, which supported by BIOS.
┐
  - Selectable Boot
  - Boot From CD
  - ATAPI ZIP Drive Boot
  - LS-120 Boot
  - BIOS Boot Specification
  - Boot From PC Card
  - Network Service Boot supported
  - I2O Boot
  - 1394 Boot

BIOS Features q
  - BIOS Characteristics
  - ACPI Supported
  - PnP is Supported
  - APM is Supported
  - ESCD Support
  - Enhanced Disk Drive (EDD)
  - BIOS is Upgradeable (Flash)
  - BIOS ROM is Socketed
  - BIOS Shadowing is Allowed
  - Smart Battery Supported
  - Int 13h - 5.25"/360kB Floppy
  - Int 13h - 5.25"/1.2MB Floppy
  - Int 13h - 3.5"/720kB Floppy
  - Int 13h - 3.5"/2.88MB Floppy
  - Int 5h, Print Screen Service
  - Int 9h, 8042 Keyboard Services
  - Int 14h, Serial Services
  - Int 17h, Printer Services
  - Int 10h, CGA/Mono Video Services
  - Int 13h - Floppy for NEC 9800
  - Int 13h - Floppy for Toshiba
  - NEC PC-98
$
Advanced Power Management Features │
  - 16-bit PM Interface Support
  - 32-bit PM Interface Support
  - CPU Idle Call Reduces Processor Speed
  - BIOS Power Management Disabled
  - BIOS Power Management Disengaged
'!
PCI/AGP Info ▄ B ▀▀▀▀▀▀▀▀▀▀▀▀▀
  PCI Bus Version: If not installed - Not Present.
Y
  Number of PCI Buses: The number is 1 for single processor  systems
  without AGP bus.

Bus N, Device N, Function N [
  Information about PCI device on bus number N,  device number N and
  function number N.
l
  Vendor: Code and name of the device vendor.  For  example,    code
  8086h belongs to Intel Corporation.
ç
  Device: Code and name of the PCI device. Program can identify many
  devices installed on a PCI bus - from chipsets to video cards.
3
  Subsys Vendor: Unavailable on some PCI devices.
2
  Subsystem ID: Unavailable on some PCI devices.

  Class: Class of the device.
7
  SubClass: Subclass of the PCI device of this class.
%
  Revision: Revision of the vendor.
4
  Interface: Type of the device program interface.

Device Properties B
  Device Timing: Possible values - fast, medium, slow, reserved.
9
  Memory Access: Device response to I/O Space accesses.
9
  I/O Access: Device response to Memory Space accesses.
A
  Bus Master: Device ability to act as a master on the PCI bus.
E
  66 MHz Speed Support: Device is capable of running at 66 MHz bus.

Device Resources %
  The following items are optional.
-
  SMBus Port: Base port of access to SMBus.
+
  ROM Address: ROM address of the device.
;
  Memory Address: Range of the device's memory addresses.
1
  Base I/O Port: Number of the device I/O port.
0
  System IRQ: Number of the device system IRQ.
8
  Interrupt Pin: Interrupt pin used by the PCI device.

AGP Capabilities @
  AGP Version: Version of the AGP bus supported by the device.
x
  AGP Speed Supported: Speed of the AGP bus supported by the device.
  'Selected' is the current speed of the AGP bus.

  Fast Write:

  4GB Addressing:

  Side Band Addressing:
'
SPD Memory Info ▄ I ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information on all SPD memory modules in the system.

  See Slot X SPD Info
d'
Slot X SPD Info ▄ ╒ ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Provides information for memory modules with SPD support.  To read
  the information memory module  and  chipset  should  support  SPD.
  Currently the program supports the following chipsets:
╞
  - with Intel PIIX4 south bridge
  - Intel 440MX
  - with  Intel ICH/ICH0/ICH2/ICH2-M/ICH3-S/ICH3-M/ICH4/ICH4-M/ICH5/
    ICH5R/ICH6/6300ESB hub
  - with VIA 596/A/B south bridge
  - with VIA 686/A/B south bridge
  - with VIA VT8231/VT8233/VT8233A/VT8233C/VT8235/VT8237 south bridge
  - with Reliance OSB4/CSB5/CSB6 south bridge
  - with AMD 755/756/766/768/8111 south bridge
  - with ALI 1533/1543/1535 south bridge
  - nVidia nForce/nForce2/nForce3.
D
  Note: SPD reading is blocked on some Asustek motherboard models.

Memory Slot N Info 5
  Information about memory module in slot number N.
α
  Memory Type: Memory module features - size,  speed (PC66,   PC100,
  PC133 for SDRAM; PC1600,  PC2100,  PC2700,  PC3200 for DDR SDRAM),
  memory usage type (SDRAM,  DDR SDRAM,  DDR  SGRAM,    DDR2  SDRAM,
  DRDRAM, EDO).
½
  Manufacturer:  Memory  module  manufacturer.    If  module  memory
  manufacturer is unknown (memory was made  in  China)  the  program
  will identify it as "Noname".
:
  Module Type: Memory module type (DIMM, RIMM, SO-RIMM).

  Number of Rows/Banks:
¥
  Module Attributes: Possible  values:  'Unbuffered',    'Buffered',
  'Registered, Unbuffered', 'Registered,  Buffered'.  Only for SDRAM
  and DDR memory.
╩
  Error  Checking:  Memory  module  error   checking. None - absent,
  Parity - parity check,  ECC - error correction (in brackets  error
  correction module discharge). Only for SDRAM and DDR memory.
ε
  CAS# Latency: Time it takes to position the  proper  sector  under
  the read/write head.  In brackets: Cycle  Time  in  nanoseconds  /
  maximum frequency in MHz, Timings, CL-tRCD-tRP-tRAS, Access Time -
  access time in nanoseconds.
0
  CLS# Latency: CLS# Latency. Only for DRDRAM.
+
  CS# Latency: CS# Latency. Only for DDR.
+
  WE# Latency: WE# Latency. Only for DDR.
-
  Refresh Rate: Memory module refresh rate.
(
  Data Width: External bus data width.
A
  SDRAM Width: Memory module organization. Only for SDRAM, DDR.
7
  Voltage Interface: Memory module voltage interface.
G
  Protocol Version: Current RDDRAM protocol version. Only for RDDRAM.
3
  SPD Revision: Number of the using SPD revision.
$
  Part Number: Unique part number.
7
  Manufacturer Date: Memory module manufacturer date.
1
  Serial Number: Unique module's serial number.
6
  Revision Code: Number of the module revision code.
ê
  Note:  Some  characteristics  of  Noname  memory  modules  can  be
  identified as 'None', i.e. corresponding information is absent.
'
DMI Memory Info ▄ É ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  For motherboard with DMI/SMBIOS support version 2.2 or higher.
  For motherboard with DMI/SMBIOS support version below 2.2.
(>i:'
DMI Memory Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
Physical Memory Array N Info 1
  Information about memory controller number N.
=
  Maximum Capacity: Maximum memory capacity for this array.
i
  Location: Physical location of the memory array,  whether  on  the
  system board or an add-in board.
=
  Use: Identifies the function for which the array is used.
y
  Memory  Error  Correct.:  Primary  hardware  error  correction  or
  detection method supported by this memory array.
_
  Memory Devices: Number of slots or sockets  available  for  memory
  devices in this array.

  Structure Length:

Memory Device N Info _
  Describes a single memory device number N that is part of a larger
  physical memory array.
D
  Size: Size of the memory device. If not installed - Not Present.
C
  Form Factor: Implementation form factor for this memory device.
4
  Memory Type: Type of memory used in this device.
B
  Speed: Identifies the speed of the device, in megahertz (MHz).
à
  Device Locator:  String  that  identifies  the  physically-labeled
  socket or board position where the memory device is located.
ä
  Bank Locator: String number of  the  string  that  identifies  the
  physically labeled bank where the memory device is located.
╬
  Total Width: Total width,   in  bits,    of  this  memory  device,
  including any check or error-correction bits.   If  there  are  no
  error-correction bits, this value should be equal to Data Width.
;
  Data Width: Data width, in bits, of this memory device.
╞
  Device Set: Identifies when the memory device is one of a  set  of
  Memory Devices that must be populated with all devices of the same
  type and size, and the set to which this device belongs.
=
  Type Detail: Additional detail on the memory device type.
-
  Manufacturer: Memory device manufacturer.
/
  Serial Number: Memory device serial number.

  Asset Tag:
+
  Part Number: Memory device part number.

  Structure Length:
'
DMI Memory Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
Memory Controller N Info 1
  Information about memory controller number N.
B
  Maximum Capacity: Maximum memory capacity for this controller.
r
  Memory Types: Describes the physical characteristics of the memory
  modules that are supported by the system.
d
  Memory Slots: Number of slots  or  sockets  available  for  memory
  devices in this controller.
D
  Error Correcting: Memory controller error correcting capability.
x
  En. Error Correcting: Identifies the error correcting capabilities
  that were enabled when the structure was built.
>
  Error Detecting: Memory controller error detecting method.
3
  Current Interleave: Current interleave support.
/
  Supported Interleave: Supported interleave.
a
  Supported Speeds:  Describes  the  speed  of  the  memory  modules
  supported by the system.
}
  Module Voltage: Describes the required voltages for  each  of  the
  memory module sockets controlled by this controller.

  Structure Length:

Memory Module N Info d
  Describes a single memory module number N that is part of a larger
  physical memory controller.
Q
  Installed Size: Size of the memory device.  If not installed - Not
  Present.
4
  Memory Type: Type of memory used in this device.
.
  Socket Designation: Reference designation.
5
  Bank Connections: Memory bank connections (RAS#).
5
  Current Speed: Speed of the memory module, in ns.
n
  Enabled Size: Identifies the amount of  memory  currently  enabled
  for the system's use from the module.
-
  Error Status: Memory module error status.

  Structure Length:
'
IDE (ATA/ATAPI) Info ▄ Y ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Information on the ATA/ATAPI devices installed on the computer.
f
  See:
    HDD Info - Information about ATA devices
    ATAPI Info - Information about ATAPI devices
~½
'
HDD Info ▄ G ▀▀▀▀▀▀▀▀▀
  HDD Model: HDD vendor and model read from IDE-controller.
∙
  HDD Default Size: Real HDD size read from the IDE-controller.  Due
  to the two different ways of defining 'megabyte'  your  hard  disk
  capacity  can  be  calculated  in  two  different   ways:    after
  calculating   the    number    of    bytes    in    the    formula
  heads*sectors*cylinder*512-bytes-per-sector you may get the result
  in the unit 'megabyte' by dividing either by  1024*1024  (like  in
  the BIOS of the computer does) or by 1000*1000 (like the producers
  of hard disks do).
Ö
  Geometry: Logical number of heads,  sectors per track  and  tracks
  while CHS addressing.  It has nothing  to  do  with  physical  HDD
  parameters.
\
  Compatibility: Compatibility of  this  device  with  the  specific
  ATA/ATAPI standard.
,
  Serial Number: HDD unique serial number.
X
  Controller Revision:  Number  of  the  revision  returned  by  the
  IDE-controller.
╟
  HDD Marketing Size: The marketing size much more than  real  size.
  In  one  'computer'  megabyte  of  1048576  bytes,    but  in  one
  'marketing' (used by HDD manufacturers) of 1000000 bytes.
·
  Buffer Size: Buffer size of the IDE-controller (you shouldn't  mix
  it up with disk cache).  Part of the buffer can be used for system
  purposes, and its real size can be smaller.  Some hard disks don't
  provide information on the buffer size.
∩
  Buffer Type: Internal buffer type of the IDE-controller.  Possible
  values - 'Not specified',  'Single ported single  sector  buffer',
  'Dual ported multi-sector  buffer',    'Dual  ported  multi-sector
  buffer with a read caching'.
*
  ECC bytes: Number of correction bytes.
:
  Security Erase Time: Security Erase Time (in minutes).
1
  Enh. Security Erase: Enhanced Security Erase.
?
  Current APM Value: Current Advanced Power Management Value.
á
  Acoustic Management:  Current  value  of  the  automatic  acoustic
  management (recommended - value recommended by vendor) and  status
  (enabled/disabled)

Transfer Modes 
  PIO Mode Support: PIO (Programmed Input/Output) is a way of moving
  data between device in a computer in  which  all  data  must  pass
  through the processor.  The higher the number is,  the higher  the
  data transfer rate is (For PIO mode 4 - 16.6 MBps).
w
  SW DMA Mode Support: Number of the supported single word DMA mode.
  Active: SW DMA mode currently enabled by BIOS.
|
  MW DMA Mode Support: DMA  (Direct  Memory  Access) is  a  transfer
  protocol where a peripheral device transfers information  directly
  to or from memory,  without the system processor being required to
  perform the transaction. Apart from the previous mode, single word
  DMA modes can be supplanted by multiword DMA modes. Active: MW DMA
  mode currently enabled by BIOS.
V
  UDMA  Mode  Support:  Number  of  the  UltraDMA  mode. Theoretical
  transmission speed for UltraDMA mode 2 is 33 MB/s,   mode  5 - 100
  MB/s.  Some chipsets don't support  UltraDMA  mode  (for  example,
  chipsets i430VX and lower don't support it while  i440BX  supports
  only mode 2). Active: UltraDMA mode currently enabled by BIOS.
£
  Sectors per Interrupt: Number of sectors that can  be  transferred
  per interrupt in a block mode.  Active: Current numbers of sectors
  per interrupt.

HDD Features n
  - DMA Transfer: HDD support of the DMA mode
  - LBA Supported: LBA (Logical Block Addressing)  -  accesses  made
    through "big" logical blocks of data.  Intended to break 504  MB
    barrier so that BIOS can support disks larger than 1024 cylinders
  - Block Mode: HDD block mode. This means that more than one sector
    can be transferred on each interrupt;  newer drives allow you to
    transfer as many as 16 or 32 sectors at a time
  - Double Word I/O: Support of DMA mode with two data words
  - Standard Standby Timer
  - IORDY Supported
  - IORDY may be disabled
  - S.M.A.R.T. (Self-Monitoring, Analysis, Reporting Technology): An
    open standard for developing disk drives  and  software  systems
    that automatically monitor a  disk  drive's  health  and  report
    potential problems so that you  to  take  proactive  actions  to
    prevent impending disk crashes
  - S.M.A.R.T. Self-test
  - S.M.A.R.T. Error Logging
  - Security Mode
  - Removable Media
  - Power Management
  - PACKET Command
  - Write Cache
  - Look-ahead
  - Release Interrupt
  - Service Interrupt
  - Device Reset Command
  - Host Protected Area
  - Write Verify Command
  - Write Buffer Command
  - Read Buffer Command
  - NOP Command
  - Identify Device DMA Command
  - Download Microcode Command
  - Read/Write DMA Queued
  - CFA Feature
  - Advanced Power Management
  - Removable Media Status
  - Power-up in Standby
  - Set Features Req. to Spinup
  - Set Max Security Extension
  - Automatic Acoustic  Management:  Optimizing  the  noise-to-speed
    ratio of your hard disk
  - 48-bit Address: Support of the 48-bit LBA address
  - Device Configuration Overlay
  - Flush Cache Command
  - Flush Cache Ext Command
  - Media Serial Number
  - Media Card Pass Through
  - Streaming Feature
  - General Purpose Logging
  - Write DMA/Multiple FUA EXT
  - Write DMA Queued FUA EXT
  - World Wide Name
D
  Starting from S.M.A.R.T., every item can be enabled or disabled.
' 
ATAPI Info ▄ A ▀▀▀▀▀▀▀▀▀▀▀
  ATAPI Model: Vendor and name of the ATAPI device.
t
  ATAPI Type: Device type (HDD,  CD-ROM,  CD-RW,  DVD-ROM,  scanner,
  streamer, etc.) installed on the EIDE port.
 
  ATAPI Name: Full ATAPI name.
@
  Vendor Specific: Any text information provide by the vendor.
V
  CD Read Speed: Maximum read speed of your CD device (current value
  in brackets).
\
  CD Write Speed: Maximum write speed of  your  CD  device  (current
  value in brackets).
:
  DVD Read Speed: Current read speed of your DVD device.
<
  DVD Write Speed: Current write speed of your DVD device.
'
  Buffer Size: CD device buffer size.
3
  Loading Mechanism: Disk loading mechanism type.
8
  Rotation Control: Rotation control method (CLV/CAV).
O
  Read Retry Count: Number of read  retries  if  the  first  attempt
  fails.
v
  Write Retry Count: Number of write retries if  the  first  attempt
  fails (is important only for rewritable CDs).
\
  Compatibility:  Compatibility  of  the  device  with  the  certain
  ATA/ATAPI standard.
.
  Serial Number: Unique ATAPI serial number.
G
  Controller Revision: Version number returned by the IDE-controller.
l
  Command  DRQ  Type:  Possible    values - 'Microprocessor    DRQ',
  'Interrupt DRQ', 'Accelerated DRQ'.
C
  Command Packet Size: Possible values - '12 byte' and '16 byte'.

Transfer Modes 
  PIO Mode Support: PIO (Programmed Input/Output) is a way of moving
  data between device in a computer in  which  all  data  must  pass
  through the processor.  The higher the number is,  the higher  the
  data transfer rate is (For PIO mode 4 - 16.6 MBps).
w
  SW DMA Mode Support: Number of the supported single word DMA mode.
  Active: SW DMA mode currently enabled by BIOS.
|
  MW DMA Mode Support: DMA  (Direct  Memory  Access) is  a  transfer
  protocol where a peripheral device transfers information  directly
  to or from memory,  without the system processor being required to
  perform the transaction. Apart from the previous mode, single word
  DMA modes can be supplanted by multiword DMA modes. Active: MW DMA
  mode currently enabled by BIOS.
V
  UDMA  Mode  Support:  Number  of  the  UltraDMA  mode. Theoretical
  transmission speed for UltraDMA mode 2 is 33 MB/s,   mode  5 - 100
  MB/s.  Some chipsets don't support  UltraDMA  mode  (for  example,
  chipsets i430VX and lower don't support it while  i440BX  supports
  only mode 2). Active: UltraDMA mode currently enabled by BIOS.

Reading Features n
  - CD-R Disk Read
  - CD-RW Disk Read
  - DVD-ROM Disk Read
  - DVD-RAM Disk Read
  - DVD-R Disk Read
  - DVD-RW Disk Read
  - DVD+R Disk Read
  - DVD+RW Disk Read
  - Read Packet Using Method 2
  - Read Mode2 Form1 Sectors
  - Read Mode2 Form2 Sectors
  - Multisession Disk Read
  - READ-CD Command on AudioCD
  - Read Bar Code Capable
  - Read Lead-in (CD-Text)

Writing Features: ╥
  - CD-R Disk Write
  - CD-RW Disk Write
  - DVD-RAM Disk Write
  - DVD-R Disk Write
  - DVD-RW Disk Write
  - DVD+R Disk Write
  - DVD+RW Disk Write
  - Test Write Mode Support
  - Buffer Underrun Protection

Other Features ⁿ
  - Audio Play Support
  - CD-DA Stream is Accurate
  - Composite Audio/Video
  - Digital Output on Port 1
  - Digital Output on Port 2
  - Support Subcode R-W
  - Support Subcode R-W D&C
  - C2 Pointers Supported
  - ISRC Supported
  - UPC Supported

ATAPI Features δ
  - DMA Transfer: Drive support of the DMA mode
  - LBA Supported: LBA (Logical Block  Addressing) -  accesses  make
    through "big" logical blocks of data
  - Block Mode: Running in a block mode.  This means that more  than
    one sector can be transferred on each  interrupt;  newer  drives
    allow you to transfer as many as 16 or 32 sectors at a time
  - IORDY Support
  - IORDY may be Disabled
  - ATA Software Reset
  - Overlap Operation
  - Command Queuing
  - Interleaving DMA
'
SCSI Devices Info ▄ c ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  For SCSI detection the ASPI manager for SCSI controller should  be
  loaded.

SCSI Devices Info 4
  Device Name: Vendor and name of the SCSI device.

  Size: Real SCSI size.
G
  Device Type: SCSI device type (HDD, CD drive, scanner, tape drive).
Ö
  Geometry: Heads, Sectors, Tracks: Logical number of heads, sectors
  per track and tracks.  It has nothing  to  do  with  physical  HDD
  parameters.
R
  Compatibility: Compatibility of the device with the  certain  SCSI
  standard.
-
  Serial Number: SCSI unique serial number.
7
  Controller Revision: SCSI firmware revision number.
@
  Vendor Specific: Any text information provide by the vendor.
╟
  HDD Marketing Size: The marketing size much more than  real  size.
  In  one  'computer'  megabyte  of  1048576  bytes,    but  in  one
  'marketing' (used by HDD manufacturers) of 1000000 bytes.
╣
  Buffer Size: Buffer size of the SCSI device (you shouldn't mix  it
  up with disk cache).  Part of the buffer can be  used  for  system
  purposes, and its real size can be smaller.
A
  Rotation Speed: Specifies the speed where the medium rotates.
;
  Device Temperature: Current temperature of SCSI device.
m
  Location: Device logical address (Host, Target, LUN - host number,
  device number, logical unit number).
(
  Manager ID: SCSI manager identifier.
+
  Adapter ID: SCSI controller identifier.
O
  Read Retry Count: Number of read  retries  if  the  first  attempt
  fails.
O
  Write Retry Count: Number of write retries if  the  first  attempt
  fails.
h
  Ext. Self-Test Time: Time in seconds that the device  requires  to
  complete an extended self-test.
 
  Bus Width: Device bus width.
(
  Address Width: Device address width.

SCSI Device Features -
  - Removable Medium
  - Read Cache
  - Write Cache
  - Read Reallocate: Automatic  reallocation  of  defective  logical
    blocks during read operations.
  - Write Reallocate: Automatic reallocation  of  defective  logical
    blocks during write operations.
  - Terminate I/O Process
  - Normal ACA
  - Hierarchical Support
  - Embedded Array Controller
  - Protection Information
  - Enclosure Services
  - Multi-Ported Device
  - Medium Changer
  - Relative Addressing
  - Synchronous Transfer
  - Linked Commands
  - Soft Reset
  - Quick Arbitration
'
Drives Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀
BIOS Drives ╖
  INT 13h Extension: If this extension is not supported  BIOS  won't
  identify the correct disk size over 8 GB.  Windows  emulates  this
  extension and always returns 1.x version.
$
  Drive Letter: Name of the drive.
(
  Drive Size: Total size of the drive.
@
  Drive Type: Type of the drive (fixed, floppy, optical, RAM).
#
  Cylinders: Number of cylinders.

  Heads: Number of heads.

  Sectors: Sectors per track.

Local/Network Drives ,
  Drive Letter: Name of the logical drive.
V
  Drive Type: Type of the logical drive (fixed,  floppy,  removable,
  optical, RAM)
O
  Mapping: Remote name of the  network  drive  (for  network  drives
  only).
4
  Volume Lable: Volume lable of the logical drive.
<
  File System: Name of the file system (FAT, FAT32, NTFS).
D
  Volume Serial Number: Volume serial number of the logical drive.
0
  Total Size: Total size of the logical drive.
/
  Free Space: Free size of the logical drive.
'
USB Devices Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
USB Devices Info 
  Vendor: USB device vendor.

  Device: USB Device name.
$
  Manufacturer: Manufacturer name.

  Product: Product name.
3
  Serial Number: USB device unique serial number.
'
  Device Version: USB device version.

  Class: Device class.

  SubClass: Device subclass.

  Protocol: Device protocol.
(
  Configuration: Configuration string.
8
  USB Version: Version of USB supported by the device.
)
  Speed: Speed supported by the device.
T
  Transfer Type:  Transfer  type  (Control,    Isochronous,    Bulk,
  Interrupt).
/
  Data Packet Size: Data packet size in byte.
)
  Max Power: Maximal power consumption.

Interfase 3
  List of all interfaces supported by the device.

  Class: Interface class.
!
  SubClass: Interface subclass.
!
  Protocol: Interface protocol.

  Interface: Interface name.
'
PnP Info ▄ , ▀▀▀▀▀▀▀▀▀
  Information about PnP devices.
'
    PnP Devices Info
    ISA/PnP Info
 >!S'
PnP Devices Info ▄ 4 ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  PnP Version: PnP BIOS version.
8
  Number of PnP Devices: Number of system PnP devices.

Device Number N: 1
  Information about system PnP device number N.
3
  PnP Device Name: Name of the system PnP device.
5
  PnP Device ID: EISA-style device ID and its name.
4
  Base Type: Base type of the device and its name.
(
  SubType: Device subtype of the type.
4
  Node Size: Memory size provided for PnP devices.

Device Resources: ò
  System IRQ: Enabled system IRQ number and type.  Possible values -
  'High True Edge',  'Low True Edge',  'High True Level',  'Low True
  Level'.
¥
  DMA Channel: DMA channel number and type.  Possible values - 'Type
  8237',  'Type A',  'Type B',  'Type F',  capacity - 8/16 bit,  Bus
  Master support.
&
  I/O Port: Range of used I/O ports.
å
  Memory Address: Memory addresses range and  its  type.    Possible
  values - ROM, RAM, capacity - 8/16/32 bit, Cacheable, Shadow.
'
ISA/PnP Info ▄ û ▀▀▀▀▀▀▀▀▀▀▀▀▀
  Provides information for all ISA/PnP devices.   The  program  will
  detect them even if your BIOS doesn't support PnP. ISA/PnP Info
;
  Number of Cards: Number of the installed ISA/PnP cards.
4
  Read Port: Number of the ISA/PnP read data port.

Card Number N ,
  Information about ISA/PnP card number N.
(
  Device Name: Name of ISA/PnP device.
0
  ISA Device ID: EISA-style ISA/PnP device ID.
-
  Serial Number: Unique card serial number.
=
  PnP Version: Number of PnP version supported by the card.
:
  ANSI String: Internal text string of the ISA/PnP card.

Logical Device N £
  Information about logical device number N.  Every ISA/PnP card has
  one or more logical devices.  The following is  the  list  of  all
  these devices.
(
  Device Name: Name of logical device.
0
  Logical DevID: EISA-style logical device ID.
@
  Status: Current status of logical device - enabled/disabled.

  Compatible ID: Compatible device ID.  If  there  are  no  original
  drivers you can use drivers of this compatible device.
+
  Device Name: Name of compatible device.
:
  ANSI String: Internal text string of the ISA/PnP card.
8
  I/O Port: Number of the I/O port used by the device.
¥
  System IRQ: Number and type of the system IRQ used by the  device.
  Possible values: High True Edge,  Low True Edge,  High True Level,
  Low True Level.
l
  DMA Channel: Number and capacity of the DMA channel  used  by  the
  device. Possible values - 8/16 bit.
^
  Memory Address: Memory addresses and their  discharge.    Possible
  values - 8/16/32 bit.
'$
Printers Info ▄ i ▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Provides information for all LPT/PnP devices (printers,  scanners)
  and USB printers.

LPT/PnP Device on LPTN u
  Information about LPT/PnP device on LPT port number N.  LPT device
  should be compliant with IEEE-1284 standard.
5
  Manufacturer: Manufacturer of the LPT/PnP device.

  Model: Device model.
t
  Class: Device class. Possible values: PRINTER,  MODEM,  NET,  HDC,
  PCMCIA, MEDIA, FDC, PORTS, SCANNER, DIGCAM.
$
  Description: Device description.

  Port: Number of LPT port.
(
  Serial number: Device serial number.
"
  Memory: Installed memory size.

  Version: Device Version.

  Revision: Device Revision.
5
  Command Set: Command set supported by the device.
-
  IO Preferences: Supported IO preferences.

  Compatible ID: Compatible device ID.  If  there  are  no  original
  drivers you can use drivers of this compatible device.
)
  Status: Current status of the device.
1
  Other: Other unique ID of this device/vendor.
C
  Note: Fields are optional except Manufacturer, Model and Class.

USB Printer N +
  Information about USB printer number N.

  Vendor: Printer vendor.

  Device: Printer name.
$
  Manufacturer: Manufacturer name.

  Product: Product name.
3
  Serial Number: USB device unique serial number.
'
  Device Version: USB device version.

  Class: Device class.

  SubClass: Device subclass.

  Protocol: Device protocol.
(
  Configuration: Configuration string.
9
  USB Version : Version of USB supported by the device.
)
  Speed: Speed supported by the device.
T
  Transfer Type:  Transfer  type  (Control,    Isochronous,    Bulk,
  Interrupt).
/
  Data Packet Size: Data packet size in byte.
)
  Max Power: Maximal power consumption.
'

DMI/SMBIOS Info ▄ P ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  This window is available on system with DMI/SMBIOS support.

DMI/SMBIOS Info <
  DMI/SMBIOS Version: Version of DMI/SMBIOS specification.
?
  Number of Structures: Total number of DMI/SMBIOS structure.
`
  Structure Address: Physical  starting  address  of  the  read-only
  SMBIOS structure table.


OEM Strings )
  Free form strings defined by the OEM.

Other Structures Q
  List of DMI/SMBIOS structures (name,  code),  not supported by the
  program.
'
DMI Slots Info ▄ < ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Contains information about system slots.

Slot 6
  Slot Type: System slot type (AGP, PCI, ISA, etc.).
6
  Current Usage: Current usage - available / in use.
(
  Data Bus Width: Slot data bus width.
,
  Slot Designation: Reference designation.
:
  Slot Length: Slot length - short length / long length.
'	
DMI Ports Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
Port N $
  Information about port number N.
1
  Int. Connector Type: Internal connector type.
1
  Ext. Connector Type: External connector type.
2
  Port Type: Describes the function of the port.
^
  Int. Designator: Internal reference designator,  i.e.  internal to
  the system enclosure.
Z
  Ext. Designator: External reference designation  external  to  the
  system enclosure.
'
Monitor Info ▄  ▀▀▀▀▀▀▀▀▀▀▀▀▀
  This window is available only on  computers  with  relatively  new
  monitors and video cards supporting the VBE/DC specification.  All
  recent cards support VBE/DC (some  video  cards  have  Plug-n-Play
  ON/OFF modes - it should be ON).  It  is  necessary  to  have  new
  Plug-n-Play cord connecting videocard  and  monitor  in  order  to
  detect monitor type.

Monitor Info (
  Monitor Vendor: Monitor vendor name.
&
  Monitor Model: Monitor model name.
$
  Viewable Size: Viewable diagonal monitor size.  This size is  less
  than  the  size  of  tube  indicated  on  monitor  itself  and  in
  price-lists.  Real diagonal  size  of  14-inch  monitors  is  12.7
  inches,  of 15-inch monitors - 13.8 inches,  of 17-inch monitors -
  15.7 inches.
0
  Serial Number: Monitor unique serial number.
;
  Manufacture: Month and year of the monitor manufacture.
!
  EDID Version: VBE/DC version.
:
  Horizontal Size: Real (visible) horizontal image size.
6
  Vertical Size: Real (visible) vertical image size.
T
  Gamma Factor: Standard used to correct the  non-linear  brightness
  distortion.
2
  Display Type: Display type - color/monochrome.
7
  Input Signal: Input signal type - analogue/digital.
#
  Internal Vendor: Vendor string.
!
  Internal Model: Model string.
+
  Internal Number: Monitor serial number.
=
  Vertical Frequency: Vertical frequency rate (optionally).
A
  Horizontal Frequency: Horizontal frequency rate (optionally).

DPMS Features +
  DPMS features supported by the monitor:
n
  - Active Off - active off mode.  Energy consumption is less  than  5
    Wt, return to normal mode within 8-20 seconds
  - Suspend - suspended mode. Energy consumption is less than 30 Wt,
    return to normal mode within 4 seconds
  - Standby - standby mode. Energy consumption is less than  80%  of
    normal consumption, return to normal mode within 1 second.

Supported Modes ╦
  List  of  supported  modes  (horizontal  and  vertical  size    in
  pixels) and supported refresh frequency (in Hz). Monitor's refresh
  rate can be less than indicated in the monitor documentation.
'
Video Info ▄ 
 ▀▀▀▀▀▀▀▀▀▀▀
Video Info 5
  Video Chip Vendor: Name of the video chip vendor.
-
  Video Chip: Name of the video chip model.
4
  Subsystem Vendor: Name of the video card vendor.
/
  Subsystem ID: Name of the video card model.
ä
  Video Memory: Video memory size. Some graphics accelerators return
  not total video memory size but size identified in 2D mode.
.
  VESA OEM String: Video BIOS ID identifier.
'
  VESA Version: Version of VESA BIOS.
/
  Vendor Name: VBE vendor. For VESA 2.0 only.
$
  Product Name: For VESA 2.0 only.
,
  OEM Software Version: For VESA 2.0 only.

VESA Power Management 3
  VESA PM Version: VESA power management version.
0
  - Standby
  - Suspend
  - Off
  - Reduced On

AGP Capabilities D
  AGP Version: Version of the AGP bus supported by the video card.
i
  AGP Speed: Speed of the AGP  bus  supported  by  the  video  card.
  'Selected' is the current speed.
<
  - Fast Write
  - 4GB Addressing
  - Side Band Addressing

Supported VESA Modes ≤
  Table with all supported VESA BIOS modes containing  mode  number,
  text or graphic mode, horizontal and vertical resolution,  colors,
  pixel per bit number and supported features.  VESA 1.2  modes  are
  compatible with traditional banked only modes.    VESA  2.0  modes
  support banked+linear modes.  If your video memory is too small to
  support one of mode will be marked Not Supported in  the  Features
  section. Program displays list of additional S3 video modes for S3
  video cards.
'
Exit to DOS ▄ ' ▀▀▀▀▀▀▀▀▀▀▀▀
  Exit. Hot key - Alt-X.
'

Report ▄  ▀▀▀▀▀▀▀
  Report menu.
:
    Full Report
    Summary Report
    INI Format Report
*(+8,K'
Full Report ▄  ▀▀▀▀▀▀▀▀▀▀▀▀
  To create a file report,  choose the Full Report item (hot key F2)
  in the Report menu.  You can type the report name and comments  in
  the appeared window. By default program will create file astra.rpt
  with the content of the ASTRA's all information  windows  will  be
  created in its catalogue.  If your computer has  a  network  name,
  file report will be named after it (maximum 8 symbols).   Creation
  of summary (Report:Summary Report) and INI (Report:INI Format Report
  ) reports is also available.
+╤,±'
Summary Report ▄ 3 ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  Creation of the summary report.
'
INI Format Report ▄ ╠ ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  To create  a file  report  in INI format,  choose  the  INI Format
  Report item in the  Report menu or use /RJ command  line key. This
  file can be imported to Hardware Inspector.
/
                          Hardware Inspectror
  Hardware Inspector is the application for automated hardware asset
  tracking and inventory  management  of  hardware.    The  Hardware
  Inspector is unique because  it  keeps  separate  records  of  the
  devices,  and not just configuration settings  of  each  computer.
  Each device is assigned a passport,  and  the  program  keeps  the
  history of its transitions between workplaces and registers  their
  maintenance   information.        See    more    information    on
  http://www.hwinspector.com
'
Help ▄  ▀▀▀▀▀
  Help system menu.
'
Contents ▄ m ▀▀▀▀▀▀▀▀▀
  Program provides  you  with  a  hypertext  context-sensitive  help
  facility.  You can choose an item from the Help:Contents  menu  or
  use the hot key F1.  English is the help system default  language.
  If you wish to change it,  choose an item Help:Language.   In  the
  appea red window choose the language you need  and  click  the  OK
  button. You can navigate in the help system using cursor keys or a
  mouse on the scrolling bar. You can go to hypertext links by press
  TAB (forward) or Shift-TAB (back)  and  Enter  (go  to  the  link)
  buttons. To quit the help system, press the ESC button.
'
Language ▄ ╞ ▀▀▀▀▀▀▀▀▀
  English is the help system default language. If you wish to change
  it,  choose an item Help:Language. In the appear red window choose
  the language you need and click the OK button.
'	
About ▄ ¢ ▀▀▀▀▀▀
  This program performs computer configuration analysis and provides
  detailed information on your computer  hardware  and  its  working
  modes.
'
The Demo Concept ▄ b ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
  ASTRA is distributed as feature-limited demo version. You can  use
  it for free during a 14-day trial period.  After the trial time is
  expired,  you must either register the program or delete  it  from
  all your  storage  devices.    You  can  find  the  more  detailed
  information in the license agreement (file license.txt).
,
                           How To Register
Q
  Please visit http://www.sysinfolab.com/register.htm to  order  the
  program.
k
  Please,  contact us to get additional information  about  ordering
  our software: sales@sysinfolab.com
+
  See file register.txt for more details.
0
                         Registration Benefits
r
  1. You'll be able to create a FILE REPORT.
  2. You'll be able to run program in BATCH MODE.
  3. You'll be able to use MACROS in BATCH MODE.
  4. You'll be able to create a FILE REPORT in INI format.
  5. The program will detect the SERIAL NUMBER of DEVICES.
  6. You'll see no more nag screens.
  7. You'll get FREE technical support.
  8. You'll get FREE UPDATES  during  one  year  from  the  date  of
     purchase and 50% DISCOUNT after that.
  9. You can order ASTRA32 for Windows with 30% DISCOUNT.
  10.You'll be  able  to  import  reports  into  HARDWARE  INVENTORY
     MANAGEMENT SOFTWARE - Hardware Inspector.
',2	

 !"#$%&'()*+,-./01            fOi:$`&∩&≤>çB LTO-\ucⁿc╪næo\w╩}║~¼ô óK¼M░τ│_┤>╕₧╛½┼╖╟#╔▐╩e╙n┘░┘*┌a▄▓▄╤▀αàΓcπΣ                        